Copyright: Copyright (c) 1999 Autodesk Inc. [v.u15.0.01]


OLE Automation Error Message 1
Not implemented yet

This method or property has not been implemented yet.


OLE Automation Error Message 2
Not applicable

The method or property is not applicable to the object. To see what properties or methods apply to a particular object, use the Object Browser.


OLE Automation Error Message 3
Invalid input

An invalid input was provided. Please recheck the input and try again.


OLE Automation Error Message 4
Ambiguous input

The input is ambiguous.


OLE Automation Error Message 5
Ambiguous output

The output is ambiguous.


OLE Automation Error Message 6
Out of memory

The system is out of memory. Please free up memory by closing some applications and try again.


OLE Automation Error Message 7
Buffer too small

There is insufficient space in the memory buffer for this operation.


OLE Automation Error Message 8
Invalid open state

The object is in an improper mode for this operation.


OLE Automation Error Message 9
Handle exists

This handle already exists in the database.


OLE Automation Error Message 10
Null handle

This handle is NULL.


OLE Automation Error Message 11
Broken handle

This handle already exists but is not used in the database.


OLE Automation Error Message 12
Unknown handle

This handle is an invalid handle.


OLE Automation Error Message 13
Handle in use

This handle already exists and is in use.


OLE Automation Error Message 14
Null object pointer

The object pointer is NULL.


OLE Automation Error Message 15
Null Object ID

The object ID is NULL.


OLE Automation Error Message 16
Null block name

The block name is NULL.


OLE Automation Error Message 16a
Container not empty

The container object is not empty. It must be empty for this operation.


OLE Automation Error Message 17
Null entity pointer

The entity pointer is NULL.


OLE Automation Error Message 18
Illegal entity type

The entity type is not a valid entity type.


OLE Automation Error Message 19
Key not found

The search key does not exist.


OLE Automation Error Message 20
Duplicate key

This key already exists.


OLE Automation Error Message 21
Invalid index

The index is invalid.


OLE Automation Error Message 22
Duplicate index

There is a duplicate index present.


OLE Automation Error Message 23
Exists in database

This item is already present in the database.


OLE Automation Error Message 24
Out of disk space

The system is out of disk space. Please free up some disk space by compressing or deleting unnecessary files and try the operation again.


OLE Automation Error Message 25
Deleted entry

This entry has already been deleted.


OLE Automation Error Message 26
Negative value not allowed

A negative input is not allowed. Retry the operation with a positive value.


OLE Automation Error Message 27
Invalid extents

The extents of the entity are invalid.


OLE Automation Error Message 28
Invalid ADSRX name

The ADSRX name is invalid.


OLE Automation Error Message 29
Invalid symbol table name

The symbol table name is invalid. Check the list of valid symbol table names.


OLE Automation Error Message 30
Invalid key

The search key name is invalid.


OLE Automation Error Message 31
Invalid object type

The type of the object is invalid.


OLE Automation Error Message 32
Invalid database

The database is invalid in the current context.


OLE Automation Error Message 33
Object to be deleted

This object is marked to be deleted.


OLE Automation Error Message 34
Invalid drawing version

The drawing version is incompatible with this operation.


OLE Automation Error Message 35
Anonymous entry

Current entry is an anonymous entry.


OLE Automation Error Message 36
Illegal replacement

This replacement is illegal and is not allowed.


OLE Automation Error Message 37
End of object

This is the end of the object information.


OLE Automation Error Message 38
End of file

The end of the file has been reached.


OLE Automation Error Message 39
Object Information is being read

Object is in a read mode.


OLE Automation Error Message 40
Object is being modified

Object is in a write mode.


OLE Automation Error Message 41
Object is not open for read

The object is not open for read.


OLE Automation Error Message 42
Object is not open for write

The object is not open for write, it cannot be modified.


OLE Automation Error Message 43
Invalid class

Invalid class type.


OLE Automation Error Message 44
Invalid block name

The block name is invalid.


OLE Automation Error Message 45
No DXF field

There is a missing DXF field.


OLE Automation Error Message 46
Duplicate DXF field

There is a duplicate DXF field.


OLE Automation Error Message 47
Invalid DXF code

The DXF code is invalid.


OLE Automation Error Message 48
Invalid result buffer

The results buffer is invalid.


OLE Automation Error Message 49
Invalid DXF sequence

Invalid sequence of data.


OLE Automation Error Message 50
Filer error

Error in AutoCAD filer operation.


OLE Automation Error Message 51
Vertex definition after face definition

Invalid sequence of data.


OLE Automation Error Message 52
Invalid face vertex index

Invalid sequence of data.


OLE Automation Error Message 53
Invalid mesh vertex index

Invalid sequence of data.


OLE Automation Error Message 54
Other objects busy

The other object is currently busy.


OLE Automation Error Message 55
Add block to database first

The block has not yet been added to the database. First, add it to the database then try the operation again.


OLE Automation Error Message 56
Cannot nest block definitions

Block definitions cannot be nested.


OLE Automation Error Message 57
Drawing recovered OK

The drawing was successfully recovered.


OLE Automation Error Message 58
Drawing not recoverable

The drawing was not recoverable.


OLE Automation Error Message 59
DXF partially read

The DXF information was read partially.


OLE Automation Error Message 60
DXF read aborted

The DXF read operation was aborted.


OLE Automation Error Message 60
DXB partially read

The DXB information was partially read.


OLE Automation Error Message 61
Drawing Cyclic Redundancy Check does not match

The Drawing Cyclic Redundancy Check has failed.


OLE Automation Error Message 62
Drawing Sentinel does not match

Sentinel verification failed.


OLE Automation Error Message 63
Drawing object not read

Drawing object was not read correctly.


OLE Automation Error Message 64
No input file

There is no input file.


OLE Automation Error Message 65
Drawing needs full save

The drawing needs a full save operation.


OLE Automation Error Message 66
DXB read aborted

The DXB read operation was aborted.


OLE Automation Error Message 67
File locked by AutoCAD

The file is currently locked by AutoCAD.


OLE Automation Error Message 68
File access error

Could not access the file.


OLE Automation Error Message 69
File system error

Error in file system.


OLE Automation Error Message 70
File internal error

Internal error in file.


OLE Automation Error Message 70
Too many files open

Exceeded maximum number of open files allowed.


OLE Automation Error Message 71
Object was erased

The object was erased.


OLE Automation Error Message 72
Object permanently erased

The object was permanently erased.


OLE Automation Error Message 73
Object was open for read

The object was in a read mode.


OLE Automation Error Message 74
Object was open for write

The object was in a write mode.


OLE Automation Error Message 75
Object was open for undo

The object was open for an undo operation.


OLE Automation Error Message 76
Object was notifying

The object was notifying.


OLE Automation Error Message 77
Object was open for notify

The object was open for a notification operation.


OLE Automation Error Message 78
On locked layer

The object is on a locked layer.


OLE Automation Error Message 79
Open through owner

Invalid opening sequence.


OLE Automation Error Message 80
Subentities still open

There are open subentities for this object. Close the subentities and retry the operation.


OLE Automation Error Message 81
At maximum readers

You have exceeded the maximum number of users.


OLE Automation Error Message 82
Currently write-protected

The object is write-protected.


OLE Automation Error Message 83
Object is XRef Object

The object is an xref object.


OLE Automation Error Message 84
Not an entity

The object is not an entity.


OLE Automation Error Message 85
Multiple readers exist

The object has multiple readers existing simultaneously.


OLE Automation Error Message 86
Duplicate record name

There is a duplicate symbol table record name.


OLE Automation Error Message 87
XRef dependent

Xref dependent.


OLE Automation Error Message 88
Self-reference

There is a circular reference.


OLE Automation Error Message 89
No symbol table

The symbol table is missing.


OLE Automation Error Message 90
No symbol table record

The symbol table record is missing.


OLE Automation Error Message 91
Not open for write

The object was not open for write.


OLE Automation Error Message 92
Close was notifying

A notification operation was in process.


OLE Automation Error Message 93
Close modify aborted

The modification was aborted.


OLE Automation Error Message 94
Close partial failure

There was a partial failure on closing.


OLE Automation Error Message 95
Close failed, object damaged

The close operation failed and the object was damaged.


OLE Automation Error Message 96
Cannot be erased by caller

The object cannot be erased by the caller.


OLE Automation Error Message 97
Insert after current object

Error in inserting object.


OLE Automation Error Message 98
Fixed all errors

Fixed all errors.


OLE Automation Error Message 99
Errors left unfixed

Left errors unfixed.


OLE Automation Error Message 100
Unrecoverable errors

Unrecoverable errors.


OLE Automation Error Message 101
No database

There is no matching database.


OLE Automation Error Message 102
XData size exceeded

The xdata size for this object has been exceeded.


OLE Automation Error Message 103
Registered application ID not found

No such application is registered with AutoCAD.


OLE Automation Error Message 104
Repeat entity


OLE Automation Error Message 105
Record not in table

This record is not in the symbol table.


OLE Automation Error Message 106
Iterator done

The iterator has finished.


OLE Automation Error Message 107
Null iterator

The iterator is NULL.


OLE Automation Error Message 108
Not in block

The object is not in the block.


OLE Automation Error Message 109
Owner not in database

The owner is not present in the database.


OLE Automation Error Message 110
Owner not open for read

The owner is not open for read.


OLE Automation Error Message 111
Owner not open for write

The owner is not open for write.


OLE Automation Error Message 112
Explode before transform


OLE Automation Error Message 113
Cannot scale nonuniformly

Cannot scale the block nonuniformly.


OLE Automation Error Message 114
Object not in database

The object is not in the database.


OLE Automation Error Message 115
Not the current database

There is a reference to a database that is not the current database.


OLE Automation Error Message 116
Entity not allowed

The object cannot be an entity.


OLE Automation Error Message 117
Cannot change active viewport

Unable to change active viewport.


OLE Automation Error Message 118
Not in paperspace

The object is not in paper space.


OLE Automation Error Message 119
Command was in progress

An AutoCAD command was in progress.


OLE Automation Error Message 120
General modeling failure

General modeling failure occurred in AutoCAD.


OLE Automation Error Message 121
Out of range

The values are out of range.


OLE Automation Error Message 122
Non coplanar geometry

The geometry is noncoplanar.


OLE Automation Error Message 123
Degenerate geometry

The geometry is degenerating.


OLE Automation Error Message 124
Invalid axis

The axis is invalid.


OLE Automation Error Message 125
Point not on entity

The point is not on the entity.


OLE Automation Error Message 126
Singular point

There is a singular point.


OLE Automation Error Message 127
Invalid Offset

The offset is invalid.


OLE Automation Error Message 128
Nonplanar entity

The entity is not in a plane.


OLE Automation Error Message 129
Cannot explode entity

Unable to explode the entity.


OLE Automation Error Message 130
String too long

The string is too long.


OLE Automation Error Message 131
Invalid symbol table flag

The symbol table flag is invalid.


OLE Automation Error Message 132
Undefined linetype

The linetype is not defined.


OLE Automation Error Message 133
Invalid textstyle

The textstyle is invalid.


OLE Automation Error Message 134
Not enough linetype elements

Not enough linetype elements present to define the linetype completely.


OLE Automation Error Message 135
Too many linetype elements

More linetype elements are present than are needed to define the linetype.


OLE Automation Error Message 136
Too many items

There are too many items in the collection.


OLE Automation Error Message 137
Ignored linetype redefinition

Linetype redefinition ignored.


OLE Automation Error Message 138
Invalid UCS

The UCS is invalid.


OLE Automation Error Message 139
Invalid paperspace view

The paper space view is invalid.


OLE Automation Error Message 140
Input data unread

The input data was not fully read.


OLE Automation Error Message 141
No internal space

Out of disk space.


OLE Automation Error Message 142
Invalid dimstyle

The dimstyle is invalid.


OLE Automation Error Message 143
Invalid layer

The layer is invalid.


OLE Automation Error Message 144
User break

User interrupted the operation.


OLE Automation Error Message 145
Drawing needs recovery

Drawing is damaged and needs recovery.


OLE Automation Error Message 146
Delete entity


OLE Automation Error Message 147
Invalid fix


OLE Automation Error Message 148
FSM error


OLE Automation Error Message 149
Invalid layer name

The layer name is invalid.


OLE Automation Error Message 150
No layer group code

The layer group code is missing.


OLE Automation Error Message 151
Invalid color index

The color index is invalid.


OLE Automation Error Message 152
Invalid linetype name

The linetype name is invalid.


OLE Automation Error Message 153
Invalid linetype scale

The scale factor for linetype is invalid.


OLE Automation Error Message 154
Invalid visibility value

The visibility value is incorrect. The correct values are acTrue or acFalse.


OLE Automation Error Message 155
Proper class separator expected

Data is not separated by proper subclasses.


OLE Automation Error Message 156
Pager error

Pager cannot write to page file.


OLE Automation Error Message 157
Out of pager memory

Out of pager memory.


OLE Automation Error Message 158
Pager write error

Error in writing to the pager file.


OLE Automation Error Message 159
Object was not forwarding

Object ID is not forwarding.


OLE Automation Error Message 160
Invalid ID map

Invalid ID map.


OLE Automation Error Message 161
Invalid owner object

The owner object for this object is invalid.


OLE Automation Error Message 162
Owner not set

The owner of this object is not set.


OLE Automation Error Message 163
Invalid subentity type

The subentity type is incorrect.


OLE Automation Error Message 164
No active transactions

There are no active transactions.


OLE Automation Error Message 165
Not top transaction


OLE Automation Error Message 166
Transaction open while command ended


OLE Automation Error Message 167
Committing

The changes to the object are being saved.


OLE Automation Error Message 168
Not newly created

This is not a newly created object.


OLE Automation Error Message 169
Exists in group

This object is already in the group.


OLE Automation Error Message 170
Not in group

This object is not in the group.


OLE Automation Error Message 171
Invalid REFIID

The reference ID is invalid.


OLE Automation Error Message 172
Invalid normal

The normal is invalid.


OLE Automation Error Message 173
Invalid style

The style is invalid.


OLE Automation Error Message 174
Cannot restore from ACIS file

Unable to restore the object from ACIS data.


OLE Automation Error Message 175
Start point must differ from vertex point

Start and vertex points are identical. The start point must differ from the vertex point.


OLE Automation Error Message 176
Reference line cannot be parallel to Z axis of UCS


OLE Automation Error Message 177
Drawing file is write protected

The drawing file is write-protected and cannot be written to. Change the properties of the file to enable writing to the file, if possible.


OLE Automation Error Message 178
Permission denied for file: {name: Locked by {name} at {time} on {date}

The named file is currently locked and in use by another user. Please retry later.


OLE Automation Error Message 179
Drawing already exists, rename file

A drawing name with the same name already exists. Use a different name or rename the existing drawing file.


OLE Automation Error Message 180
Block {name} not found

This block name does not exist in the drawing.


OLE Automation Error Message 181
Cannot SAVE external {name} block


OLE Automation Error Message 182
Error writing or closing file

An error occurred while writing the file or closing it.


OLE Automation Error Message 183
Cannot rename file to {name}

The system was unable to rename the file to the given name.


OLE Automation Error Message 184
Out of disk space

Insufficient disk space.


OLE Automation Error Message 185
Invalid or read-only directory specified for AutoSave

The directory for AutoSave is a read-only directory. Change the properties of this directory to read-write.


OLE Automation Error Message 186
Invalid AutoSave file name, default to "auto.sv$”

The given AutoSave file name is invalid. The AutoCAD default name for the AutoSave file will be used.


OLE Automation Error Message 187
Invalid selection set name

The selection set name is invalid.


OLE Automation Error Message 188
Invalid entity name

The entity name is invalid.


OLE Automation Error Message 189
Cannot find last entity

Unable to locate the last entity in the database.


OLE Automation Error Message 190
Illegal deletion of viewport entity

Failed to delete the viewport entity.


OLE Automation Error Message 191
Invalid arguments in coordinate transform request

The arguments for the coordinate transformation request are invalid. Recheck the arguments and try again.


OLE Automation Error Message 192
Invalid use of deleted entity

The deleted entity can not be used in this manner.


OLE Automation Error Message 193
Cannot set read-only variable

The variable is read-only and cannot be set.


OLE Automation Error Message 194
Zero value not allowed

The value for this parameter cannot be zero.


OLE Automation Error Message 195
Invalid layer name

The layer name is invalid.


OLE Automation Error Message 196
Invalid linetype name

The linetype name is invalid.


OLE Automation Error Message 197
Invalid color name

The color name is invalid.


OLE Automation Error Message 198
Invalid text style name

The text style name is invalid.


OLE Automation Error Message 199
Invalid shape name

The shape name is invalid.


OLE Automation Error Message 200
Invalid block name

The block name is invalid.


OLE Automation Error Message 201
Invalid normal vector

The normal vector is invalid.


OLE Automation Error Message 202
Mandatory field missing

A required field is missing.


OLE Automation Error Message 203
Cannot open file

Failed to open the specified file.


OLE Automation Error Message 204
Application exists

The application is already loaded. Use GetObject to connect to it.


OLE Automation Error Message 205
Not enough memory to load application

There is insufficient memory to load the application. Free up more memory and try again.


OLE Automation Error Message 206
Invalid object in function

An invalid object has been used in this function.


OLE Automation Error Message 207
Basepoint required

A basepoint must be specified for this property or method.


OLE Automation Error Message 208
Invalid list of points

The given list of points is invalid.


OLE Automation Error Message 208
Cannot append group

Failed to append the entity to the group.


OLE Automation Error Message 209
Selection set not found

The specified selection set was not found.


OLE Automation Error Message 210
Application is not visible

The application is not visible. To make it visible, set the visible property to acTrue.


OLE Automation Error Message 210
Automation protocol extension dll oleaprot.arx is not loaded

The file oleaprot.arx is required for the ActiveX Automation feature.


OLE Automation Error Message 210
Out of memory

The system is out of memory.


OLE Automation Error Message 210
CoCreateInstance fails


OLE Automation Error Message 210
QueryInterface fails


OLE Automation Error Message 210
Calling a method on an interface failed


OLE Automation Error Message 210
Failed to create a SafeArray of specified input type

Failed to create a safe array of the specified input type.


OLE Automation Error Message 210
Error in converting a SafeArray point to a double array point

An error occurred when converting a safe array point to a double array point.


OLE Automation Error Message 210
Error in converting a double array point to SafeArray point

An error occurred when converting a double array point to a safe array point.


OLE Automation Error Message 210
Incorrect SafeArray dimension

The dimension of the safe array is incorrect.


OLE Automation Error Message 210
Incorrect number of elements in SafeArray

The number of elements in the safe array are incorrect.


OLE Automation Error Message 210
Too few elements in SafeArray or total number of elements is not a multiple of three

SafeArray for points, vectors, and so on, require the number of elements to be a multiple of three.


OLE Automation Error Message 210
AcRxClassName entry is not in the system registry

The AcRxClassName is not present in the system registry.


OLE Automation Error Message 210
Invalid argument passed in the function

The arguments passed to the function are invalid. Please recheck the arguments and their values and try again.


OLE Automation Error Message 210
Fail to cast an AcDbObject derived pointer to another AcDbObject derived pointer


OLE Automation Error Message 210
Error calling SafeArrayPutElement


OLE Automation Error Message 210
Error in calling SafeArrayGetElement


OLE Automation Error Message 211
Region is not on the current UCS plane

Region is not on the current UCS plane. Some operations may fail.


OLE Automation Error Message 211
Cannot create default wrapper for AcDbAttribute object

The system failed to create the Attribute object.


OLE Automation Error Message 211
AutoCAD main window is invisible

AutoCAD main window is invisible. To turn on the window, set the visible property of the application object to acTrue.


OLE Automation Error Message 211
Object referenced by other object(s)

This object is being referenced by other database object(s).


OLE Automation Error Message 211
UCS X axis and Y axis are not perpendicular

The UCS X axis and Y axis must be perpendicular.


OLE Automation Error Message 211
AutoCAD unable to service automation request

AutoCAD is busy and is unable to service automation request. Allow some time for AutoCAD to finish the operation and then retry.


OLE Automation Error Message 211
User input is a keyword

The user input is a keyword.


OLE Automation Error Message 211
Viewport Not Active

The viewport is not active. First make the viewport the active viewport for the drawing, then retry this operation.


OLE Automation Error Message 211
User Input is Null

The user has pressed the return key without entering any data or has pressed the cancel key.


OLE Automation Error Message 211
Invalid Menu File Type

The input file is not a correct AutoCAD menu file. The correct AutoCAD menu file is in mnc, or mns, or mnu file extension (*.mnc or *.mns or *.mnu).


OLE Automation Error Message 211
File Not Found

The input file is not found in the AutoCAD search path. Please check the file name or verify the AutoCAD search path.


OLE Automation Error Message 211
Menu Not Found In Group

The popup menu was not found in the given menu group.


OLE Automation Error Message 211
Cannot Insert the Menu

The popup menu cannot be inserted into the AutoCAD menu bar. Verify that the menu you are attempting to add does not already exist in the AutoCAD menu bar.


OLE Automation Error Message 211
Cannot Remove the Menu

The popup menu cannot be removed from the AutoCAD menu bar. Verify that the menu you are attempting to remove actually exists in the menu bar.


OLE Automation Error Message 211
Menu Exists In Group

A popup menu with the same label already exists in the menu group.


OLE Automation Error Message 211
Aliased Menu Exists In Group

A popup menu with the same alias exists in the menu group.


OLE Automation Error Message 211
Tagged Item Exists In Menu

A popup menu with the same tag exists in the menu group.


OLE Automation Error Message 211
Labeled Item Exists In Menu

An item with the same label exists in the popup menu.


OLE Automation Error Message 211
Cannot Set Help String

Fails to set the help string to the object. This is an AutoCAD internal error. Please submit your code to the AutoCAD bug tracking team so that this issue can be resolved.


OLE Automation Error Message 211
Toolbar Exists In Group

A toolbar with the same name exists in the menu group.


OLE Automation Error Message 211
Aliased Toolbar Exists In Group

A toolbar with the same alias exists in the menu group.


OLE Automation Error Message 211
Cannot Set Floating Rows

Cannot set floating rows. This is usually because the toolbar is docked. Float the toolbar and try the operation again.


OLE Automation Error Message 211
Cannot Add Toolbar Button

Error occurred when adding a toolbar button. This is usually due to improper input parameters.


OLE Automation Error Message 211
Cannot Add Button Separator

Error occurred when adding a toolbar button separator. This is usually because of improper input parameters, or because you tried to add two button separators next to one another.


OLE Automation Error Message 211
Cannot Set Separator Name

Cannot set toolbar button separator name. A separator cannot have a name.


OLE Automation Error Message 211
Not a Flyout Button

The toolbar button is not a flyout button. The invoked property is applicable only to a flyout button.


OLE Automation Error Message 211
Not a Button

The toolbar item is not a button. The invoked property is applicable only to a button.


OLE Automation Error Message 211
No Named Menu Group

There is no menu group with the specified name.


OLE Automation Error Message 211
No Named Toolbar in Group

There is no toolbar with the specified name in the menu group.